/*
Navicat MySQL Data Transfer

Source Server         : localhost
Source Server Version : 80031
Source Host           : localhost:3306
Source Database       : kq_config

Target Server Type    : MYSQL
Target Server Version : 80031
File Encoding         : 65001

Date: 2023-10-16 14:09:03
*/

SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for config_info
-- ----------------------------
DROP TABLE IF EXISTS `config_info`;
CREATE TABLE `config_info` (
  `id` bigint NOT NULL AUTO_INCREMENT COMMENT 'id',
  `data_id` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'data_id',
  `group_id` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT NULL,
  `content` longtext CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'content',
  `md5` varchar(32) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT NULL COMMENT 'md5',
  `gmt_create` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `gmt_modified` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '修改时间',
  `src_user` text CHARACTER SET utf8mb3 COLLATE utf8mb3_bin COMMENT 'source user',
  `src_ip` varchar(50) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT NULL COMMENT 'source ip',
  `app_name` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT NULL,
  `tenant_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT '' COMMENT '租户字段',
  `c_desc` varchar(256) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT NULL,
  `c_use` varchar(64) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT NULL,
  `effect` varchar(64) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT NULL,
  `type` varchar(64) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT NULL,
  `c_schema` text CHARACTER SET utf8mb3 COLLATE utf8mb3_bin,
  `encrypted_data_key` text CHARACTER SET utf8mb3 COLLATE utf8mb3_bin COMMENT '秘钥',
  PRIMARY KEY (`id`),
  UNIQUE KEY `uk_configinfo_datagrouptenant` (`data_id`,`group_id`,`tenant_id`)
) ENGINE=InnoDB AUTO_INCREMENT=127 DEFAULT CHARSET=utf8mb3 COLLATE=utf8mb3_bin COMMENT='config_info';

-- ----------------------------
-- Records of config_info
-- ----------------------------
INSERT INTO `config_info` VALUES ('1', 'application-dev.yml', 'DEFAULT_GROUP', [REDACTED], 'ef44bbafa550cfeb4ca71f5642e01a87', '2020-05-20 12:00:00', '2023-08-08 06:28:06', 0x6E61636F73, '0:0:0:0:0:0:0:1', '', '', '通用配置', 'null', 'null', 'yaml', '', '');
INSERT INTO `config_info` VALUES ('2', 'dcsoft-gateway-dev.yml', 'DEFAULT_GROUP', [REDACTED], 'fa92a4d7a9afcc52b2bf03048bd74d30', '2020-05-14 14:17:55', '2023-07-07 02:25:33', 0x6E61636F73, '0:0:0:0:0:0:0:1', '', '', '网关模块', 'null', 'null', 'yaml', '', '');
INSERT INTO `config_info` VALUES ('3', 'dcsoft-auth-dev.yml', 'DEFAULT_GROUP', 0x737072696E673A0A202072656469733A0A20202020686F73743A206C6F63616C686F73740A20202020706F72743A20363337390A2020202070617373776F72643A0A236C6963656E736520E8AEA4E8AF81E697B6E997B40A6C6963656E73653A0A2020636865636B54696D653A20333630300A2020656E61626C65643A207472756520202020, 'f6165792d43bbded7f5545e33ccbc587', '2020-11-20 00:00:00', '2023-06-25 08:12:32', 0x6E61636F73, '0:0:0:0:0:0:0:1', '', '', '认证中心', 'null', 'null', 'yaml', '', '');
INSERT INTO `config_info` VALUES ('4', 'dcsoft-monitor-dev.yml', 'DEFAULT_GROUP', [REDACTED], '6f122fd2bfb8d45f858e7d6529a9cd44', '2020-11-20 00:00:00', '2022-09-29 02:48:54', 0x6E61636F73, '0:0:0:0:0:0:0:1', '', '', '监控中心', 'null', 'null', 'yaml', '', '');
INSERT INTO `config_info` VALUES ('5', 'dcsoft-system-dev.yml', 'DEFAULT_GROUP', [REDACTED], '56c5e06eee341e82024f1fc43250cdd8', '2020-11-20 00:00:00', '2023-08-04 03:25:50', 0x6E61636F73, '0:0:0:0:0:0:0:1', '', '', '系统模块', 'null', 'null', 'yaml', '', '');
INSERT INTO `config_info` VALUES ('6', 'dcsoft-gen-dev.yml', 'DEFAULT_GROUP', [REDACTED], '9695e449209722e092e1eeced53693ea', '2020-11-20 00:00:00', '2023-08-04 03:26:03', 0x6E61636F73, '0:0:0:0:0:0:0:1', '', '', '代码生成', 'null', 'null', 'yaml', '', '');
INSERT INTO `config_info` VALUES ('7', 'dcsoft-job-dev.yml', 'DEFAULT_GROUP', [REDACTED], '2400d2bb5cf8a523001be663da0a55c9', '2020-11-20 00:00:00', '2023-08-04 03:26:15', 0x6E61636F73, '0:0:0:0:0:0:0:1', '', '', '定时任务', 'null', 'null', 'yaml', '', '');
INSERT INTO `config_info` VALUES ('8', 'dcsoft-file-dev.yml', 'DEFAULT_GROUP', [REDACTED], '2833a22210510af25bb86a27114db029', '2020-11-20 00:00:00', '2023-07-29 01:18:01', 0x6E61636F73, '192.168.1.22', '', '', '文件服务', 'null', 'null', 'yaml', '', '');
INSERT INTO `config_info` VALUES ('9', 'sentinel-dcsoft-gateway', 'DEFAULT_GROUP', [REDACTED], '9f3a3069261598f74220bc47958ec252', '2020-11-20 00:00:00', '2020-11-20 00:00:00', null, '0:0:0:0:0:0:0:1', '', '', '限流策略', 'null', 'null', 'json', null, '');

-- ----------------------------
-- Table structure for config_info_aggr
-- ----------------------------
DROP TABLE IF EXISTS `config_info_aggr`;
CREATE TABLE `config_info_aggr` (
  `id` bigint NOT NULL AUTO_INCREMENT COMMENT 'id',
  `data_id` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'data_id',
  `group_id` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'group_id',
  `datum_id` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'datum_id',
  `content` longtext CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT '内容',
  `gmt_modified` datetime NOT NULL COMMENT '修改时间',
  `app_name` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT NULL,
  `tenant_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT '' COMMENT '租户字段',
  PRIMARY KEY (`id`),
  UNIQUE KEY `uk_configinfoaggr_datagrouptenantdatum` (`data_id`,`group_id`,`tenant_id`,`datum_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb3 COLLATE=utf8mb3_bin COMMENT='增加租户字段';

-- ----------------------------
-- Records of config_info_aggr
-- ----------------------------

-- ----------------------------
-- Table structure for config_info_beta
-- ----------------------------
DROP TABLE IF EXISTS `config_info_beta`;
CREATE TABLE `config_info_beta` (
  `id` bigint NOT NULL AUTO_INCREMENT COMMENT 'id',
  `data_id` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'data_id',
  `group_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'group_id',
  `app_name` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT NULL COMMENT 'app_name',
  `content` longtext CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'content',
  `beta_ips` varchar(1024) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT NULL COMMENT 'betaIps',
  `md5` varchar(32) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT NULL COMMENT 'md5',
  `gmt_create` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `gmt_modified` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '修改时间',
  `src_user` text CHARACTER SET utf8mb3 COLLATE utf8mb3_bin COMMENT 'source user',
  `src_ip` varchar(50) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT NULL COMMENT 'source ip',
  `tenant_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT '' COMMENT '租户字段',
  `encrypted_data_key` text CHARACTER SET utf8mb3 COLLATE utf8mb3_bin COMMENT '秘钥',
  PRIMARY KEY (`id`),
  UNIQUE KEY `uk_configinfobeta_datagrouptenant` (`data_id`,`group_id`,`tenant_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb3 COLLATE=utf8mb3_bin COMMENT='config_info_beta';

-- ----------------------------
-- Records of config_info_beta
-- ----------------------------

-- ----------------------------
-- Table structure for config_info_tag
-- ----------------------------
DROP TABLE IF EXISTS `config_info_tag`;
CREATE TABLE `config_info_tag` (
  `id` bigint NOT NULL AUTO_INCREMENT COMMENT 'id',
  `data_id` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'data_id',
  `group_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'group_id',
  `tenant_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT '' COMMENT 'tenant_id',
  `tag_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'tag_id',
  `app_name` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT NULL COMMENT 'app_name',
  `content` longtext CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'content',
  `md5` varchar(32) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT NULL COMMENT 'md5',
  `gmt_create` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `gmt_modified` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '修改时间',
  `src_user` text CHARACTER SET utf8mb3 COLLATE utf8mb3_bin COMMENT 'source user',
  `src_ip` varchar(50) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT NULL COMMENT 'source ip',
  PRIMARY KEY (`id`),
  UNIQUE KEY `uk_configinfotag_datagrouptenanttag` (`data_id`,`group_id`,`tenant_id`,`tag_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb3 COLLATE=utf8mb3_bin COMMENT='config_info_tag';

-- ----------------------------
-- Records of config_info_tag
-- ----------------------------

-- ----------------------------
-- Table structure for config_tags_relation
-- ----------------------------
DROP TABLE IF EXISTS `config_tags_relation`;
CREATE TABLE `config_tags_relation` (
  `id` bigint NOT NULL COMMENT 'id',
  `tag_name` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'tag_name',
  `tag_type` varchar(64) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT NULL COMMENT 'tag_type',
  `data_id` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'data_id',
  `group_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'group_id',
  `tenant_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT '' COMMENT 'tenant_id',
  `nid` bigint NOT NULL AUTO_INCREMENT,
  PRIMARY KEY (`nid`),
  UNIQUE KEY `uk_configtagrelation_configidtag` (`id`,`tag_name`,`tag_type`),
  KEY `idx_tenant_id` (`tenant_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb3 COLLATE=utf8mb3_bin COMMENT='config_tag_relation';

-- ----------------------------
-- Records of config_tags_relation
-- ----------------------------

-- ----------------------------
-- Table structure for group_capacity
-- ----------------------------
DROP TABLE IF EXISTS `group_capacity`;
CREATE TABLE `group_capacity` (
  `id` bigint unsigned NOT NULL AUTO_INCREMENT COMMENT '主键ID',
  `group_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL DEFAULT '' COMMENT 'Group ID，空字符表示整个集群',
  `quota` int unsigned NOT NULL DEFAULT '0' COMMENT '配额，0表示使用默认值',
  `usage` int unsigned NOT NULL DEFAULT '0' COMMENT '使用量',
  `max_size` int unsigned NOT NULL DEFAULT '0' COMMENT '单个配置大小上限，单位为字节，0表示使用默认值',
  `max_aggr_count` int unsigned NOT NULL DEFAULT '0' COMMENT '聚合子配置最大个数，，0表示使用默认值',
  `max_aggr_size` int unsigned NOT NULL DEFAULT '0' COMMENT '单个聚合数据的子配置大小上限，单位为字节，0表示使用默认值',
  `max_history_count` int unsigned NOT NULL DEFAULT '0' COMMENT '最大变更历史数量',
  `gmt_create` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `gmt_modified` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '修改时间',
  PRIMARY KEY (`id`),
  UNIQUE KEY `uk_group_id` (`group_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb3 COLLATE=utf8mb3_bin COMMENT='集群、各Group容量信息表';

-- ----------------------------
-- Records of group_capacity
-- ----------------------------

-- ----------------------------
-- Table structure for his_config_info
-- ----------------------------
DROP TABLE IF EXISTS `his_config_info`;
CREATE TABLE `his_config_info` (
  `id` bigint unsigned NOT NULL,
  `nid` bigint unsigned NOT NULL AUTO_INCREMENT,
  `data_id` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL,
  `group_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL,
  `app_name` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT NULL COMMENT 'app_name',
  `content` longtext CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL,
  `md5` varchar(32) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT NULL,
  `gmt_create` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP,
  `gmt_modified` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP,
  `src_user` text CHARACTER SET utf8mb3 COLLATE utf8mb3_bin,
  `src_ip` varchar(50) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT NULL,
  `op_type` char(10) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT NULL,
  `tenant_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT '' COMMENT '租户字段',
  `encrypted_data_key` text CHARACTER SET utf8mb3 COLLATE utf8mb3_bin COMMENT '秘钥',
  PRIMARY KEY (`nid`),
  KEY `idx_gmt_create` (`gmt_create`),
  KEY `idx_gmt_modified` (`gmt_modified`),
  KEY `idx_did` (`data_id`)
) ENGINE=InnoDB AUTO_INCREMENT=118 DEFAULT CHARSET=utf8mb3 COLLATE=utf8mb3_bin COMMENT='多租户改造';

-- ----------------------------
-- Records of his_config_info
-- ----------------------------

-- ----------------------------
-- Table structure for permissions
-- ----------------------------
DROP TABLE IF EXISTS `permissions`;
CREATE TABLE `permissions` (
  `role` varchar(50) NOT NULL,
  `resource` varchar(255) NOT NULL,
  `action` varchar(8) NOT NULL,
  UNIQUE KEY `uk_role_permission` (`role`,`resource`,`action`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb3;

-- ----------------------------
-- Records of permissions
-- ----------------------------

-- ----------------------------
-- Table structure for roles
-- ----------------------------
DROP TABLE IF EXISTS `roles`;
CREATE TABLE `roles` (
  `username` varchar(50) NOT NULL,
  `role` varchar(50) NOT NULL,
  UNIQUE KEY `idx_user_role` (`username`,`role`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb3;

-- ----------------------------
-- Records of roles
-- ----------------------------
INSERT INTO `roles` VALUES ('nacos', 'ROLE_ADMIN');

-- ----------------------------
-- Table structure for tenant_capacity
-- ----------------------------
DROP TABLE IF EXISTS `tenant_capacity`;
CREATE TABLE `tenant_capacity` (
  `id` bigint unsigned NOT NULL AUTO_INCREMENT COMMENT '主键ID',
  `tenant_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL DEFAULT '' COMMENT 'Tenant ID',
  `quota` int unsigned NOT NULL DEFAULT '0' COMMENT '配额，0表示使用默认值',
  `usage` int unsigned NOT NULL DEFAULT '0' COMMENT '使用量',
  `max_size` int unsigned NOT NULL DEFAULT '0' COMMENT '单个配置大小上限，单位为字节，0表示使用默认值',
  `max_aggr_count` int unsigned NOT NULL DEFAULT '0' COMMENT '聚合子配置最大个数',
  `max_aggr_size` int unsigned NOT NULL DEFAULT '0' COMMENT '单个聚合数据的子配置大小上限，单位为字节，0表示使用默认值',
  `max_history_count` int unsigned NOT NULL DEFAULT '0' COMMENT '最大变更历史数量',
  `gmt_create` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `gmt_modified` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '修改时间',
  PRIMARY KEY (`id`),
  UNIQUE KEY `uk_tenant_id` (`tenant_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb3 COLLATE=utf8mb3_bin COMMENT='租户容量信息表';

-- ----------------------------
-- Records of tenant_capacity
-- ----------------------------

-- ----------------------------
-- Table structure for tenant_info
-- ----------------------------
DROP TABLE IF EXISTS `tenant_info`;
CREATE TABLE `tenant_info` (
  `id` bigint NOT NULL AUTO_INCREMENT COMMENT 'id',
  `kp` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'kp',
  `tenant_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT '' COMMENT 'tenant_id',
  `tenant_name` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT '' COMMENT 'tenant_name',
  `tenant_desc` varchar(256) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT NULL COMMENT 'tenant_desc',
  `create_source` varchar(32) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin DEFAULT NULL COMMENT 'create_source',
  `gmt_create` bigint NOT NULL COMMENT '创建时间',
  `gmt_modified` bigint NOT NULL COMMENT '修改时间',
  PRIMARY KEY (`id`),
  UNIQUE KEY `uk_tenant_info_kptenantid` (`kp`,`tenant_id`),
  KEY `idx_tenant_id` (`tenant_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb3 COLLATE=utf8mb3_bin COMMENT='tenant_info';

-- ----------------------------
-- Records of tenant_info
-- ----------------------------

-- ----------------------------
-- Table structure for users
-- ----------------------------
DROP TABLE IF EXISTS `users`;
CREATE TABLE `users` (
  `username` varchar(50) NOT NULL,
  `password` varchar(500) NOT NULL,
  `enabled` tinyint(1) NOT NULL,
  PRIMARY KEY (`username`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb3;

-- ----------------------------
-- Records of users
-- ----------------------------
INSERT INTO `users` VALUES ('nacos', '$2a$10$EuWPZHzz32dJN7jexM34MOeYirDdFAZm2kuWj7VEOJhhZkDrxfvUu', '1');
